TPPPTDXDDDDDDLGDV123123456 M(gg)GeV/c20.20.40.60.81.0

Events

/.008 GeV / c 2120080040000.81.21.62.02.412000800040000 M(hp—)GeV/c2

Events

/.020 GeV / c 21.01.21.41.61.8 M(hp—)GeV/c2-0.4-0.20.00.20.4

F

— B F + B

F — B F + B

Events

/.020 GeV / c 21.01.41.82.2300200100 M(hp0)GeV/c20.601.01.21.41.6-0.4-0.20.00.20.4 M(hp0)GeV/c2

F

— B F + B

F — B F + B

M(hh)(GeV/c2)1.21.41.6

Entries/.040 GeV/c

201.82.02.22.420406080100120140 |t|0.20.40.60.81.0100.01100

Events

/.02 ( GeV / c ) 2cos (q)0.20.40.60.81.00.0

Events

/.05 (arb. units)