8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

CPVC 1

pedestals

8000.0 Run number 0.0

50.0

100.0

150.0

200.0

CPVC 1

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

CPVC 2

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

CPVC 2

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

CPVC 3

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

CPVC 3

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

CPVC 4

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

CPVC 4

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

CPVC 5

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

CPVC 5

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

CPVC 6

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

CPVC 6

sigmas

DEA 1

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

DEA 2

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

DEA 2

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

DEA 3

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

DEA 3

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

DEA 4

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

DEA 4

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

DEA 5

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

DEA 5

sigmas

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

100.0

200.0

300.0

400.0

500.0

600.0

700.0

800.0

DEA 6

pedestals

8000.0 8500.0 9000.0 9500.0 10000.0 10500.0 Run number 0.0

50.0

100.0

150.0

200.0

DEA 6

sigams