Exotic Meson Signal in the ηπ� System in π�p Interactions at 18 GeV/c Neal M. Cason for the E852 Collaboration

University of Notre Dame, Notre Dame, IN 46556

Abstract. The ηπ� system has been studied in the reaction π�p ! ηπ�p at 18 GeV/c. A mass-dependent analysis of the results of a partial-wave analysis shows that the asymmetry observed in the angular distribution can be understood in terms of interference between the a2(1320) and an exotic meson with JPC = 1�+.